A ALBERT-LUDWIGS- UNIVERSITÄT FREIBURG

INSTITUT FÜR INFORMATIK

Dr. Christoph Scholl Dipl.Inf. Tobias Schubert

Datenblatt I zur Vorlesung

Technische Informatik II (WS 2000/2001)

Verzögerungszeiten von Grundgattern

NAND NOT AND OR EXOR 74F00 74F04 74F08 74F32 74F86 min max min max min max min max min max t_{P LH} 2.4 6.0 2.4 6.0 3.0 6.6 3.0 6.6 3.5 8.0 t_{P HL} 1.5 5.3 1.5 5.3 2.5 6.3 3.0 6.3 3.0 7.5

Parameterwerte von Treibern

nicht inv. inv. 74F244 74F240 min max min max t_{P LH} Verzögerungszeiten bei /OE = 0 2.5 6.2 3.0 8.0 t_{P HL} 2.5 6.5 2.0 5.7 t_{P ZH} Enable Zeiten 2.0 6.7 2.0 5.7 t_{P ZL} 2.0 8.0 4.0 10.0 t_{P HZ} Disable Zeiten 2.0 7.0 2.0 6.3 t_{P LZ} 2.0 7.0 2.0 9.5

Parameterwerte von SRAMs

Vorlesung

Symbol Name min max t_{acc} Lesezugriffszeit 3n+ 2.5 13.2n+ 6.6 w Schreibpulsweite 1.575n+35.8 t_{SAW} Setup-Zeit von A bis W 5.975n+11.3 t_{HW A} Hold-Zeit von A nach W 2.2n+17.8 t_{SDW} Setup-Zeit von D bis W 1.575n+19.8 t_{HW D} Hold-Zeit von D nach W 1.575n+23.8 t_{P W D} Verzögerungszeit von W bis D 3.625n+ 9.4 8.8n+36.3

CY7C191-45 Symbol Name min max t_{acc} Lesezugriffszeit 3.0 45.0 w Schreibpulsweite 22.0 t_{SAEW} Setup-Zeit von A bis Ende W 35.0 t_{HW A} Hold-Zeit von A nach W 0.0 t_{SDEW} Setup-Zeit von D bis Ende W 15.0 t_{HW D} Hold-Zeit von D nach W 0.0

Parameterwerte des R/S-FlipFlop

Vorlesung

Symbol Name min max x Pulsweite 22.3 t_{P/SQ} Verzögerungszeit von /S bis Q 2.4 6.0 t_{P/S/Q} Verzögerungszeit von /S bis /Q 3.9 11.3 t_{P/RQ} Verzögerungszeit von /R bis Q 3.9 11.3 t_{P/R/Q} Verzögerungszeit von /R bis /Q 2.4 6.0

Parameterwerte von D-Latches

Vorlesung

Symbol Name min max y Pulsweite des Schreibimpulses 25.2 t_{SDW} Setup-Zeit von D bis W 16.3 t_{HW D} Hold-Zeit von D nach W 11.0 t_{P W Q} Verzögerungszeit von W bis Q 3.9 16.6 t_{P DQ} Verzögerungszeit von D bis Q 3.9 22.6

FAST: 74F374 Symbol Name min max y Pulsweite des Schreibimpulses 7.0 t_{SDW} Setup-Zeit von D bis W 2.0 t_{HW D} Hold-Zeit von D nach W 2.0 t_{P W Q} Verzögerungszeit von W bis Q 4.0 10.0

Parameterwerte von D-FlipFlops

Vorlesung

Symbol Name min max t_C Zykluszeit 138.0 t_{SDC} Setup-Zeit von D bis CK 13.3 t_{HCD} Hold-Zeit von D nach CK 88.6 t_{P CQ} Verzögerungszeit von CK bis Q 6.9 23.2

FAST: 74F74 Symbol Name min max t_C Zykluszeit 10.0 t_{SDC} Setup-Zeit von D bis CK 3.0 t_{HCD} Hold-Zeit von D nach CK 1.0 t_{P CQ} Verzögerungszeit von CK bis Q 3.8 9.2